– 1 –

Table 1. Catalog Table Statistics

PSQs QSOs

Table Item mean σ mean σ

u band 19.885 0.690 19.682 0.961 g band 19.242 0.665 19.266 0.839 r band 18.600 0.664 18.998 0.790 i band 18.195 0.718 18.803 0.816 z band 17.929 0.680 18.614 0.814 Balmer Break 1.140 0.154 0.901 0.187 CaK 2.699 1.518 1.341 1.748 CaH 2.590 1.353 0.566 1.231 Hδ 0.766 0.753 0.089 0.600 Redshift 0.248 0.135 0.534 0.270

aComparisons are for z < 1.00