KITT PEAK NATIONAL OBSERVATORY  4-Meter R.C./CRYOCAM SPECTROGRAPH CCD LOG  Page 1

UT Date \underline{01/03/06} Observers \underline{P.Nandra,M.Brotherton}  CCD \underline{f3k}  Format \underline{1:3072,430:680}  Gain \underline{2.30}

Coll. Focus \underline{1} Decker \underline{98} Grating/Grism \underline{bl181} Filter \underline{gg455} Program \underline{SHEEP}

Disk  Exp UT Hour Air  Gr. Slit
Spectrum  Object  Time Start Angle Mass Tilt Width P.A.  Comments

a0001.fits   flat                   0.7 23:48 -0:09 1.001
a0002.fits   flat                   0.7 23:48 -0:09 1.001
a0003.fits   flat                   0.7 23:49 -0:09 1.001
a0004.fits   flat                   0.7 23:49 -0:09 1.001
a0005.fits   flat                   0.7 23:50 -0:09 1.001
a0006.fits   flat                   0.7 23:50 -0:09 1.001
a0007.fits   flat                   0.7 23:51 -0:09 1.001
a0008.fits   flat                   0.7 23:51 -0:09 1.001
a0009.fits   flat                   0.7 23:52 -0:09 1.001
a0010.fits   flat                   0.7 23:52 -0:09 1.001
a0011.fits   flat                   0.7 23:53 -0:09 1.001
a0012.fits   flat                   0.7 23:53 -0:09 1.001
a0013.fits   flat                   0.7 23:54 -0:09 1.001
a0014.fits   flat                   0.7 23:55 -0:09 1.001
a0015.fits   flat                   0.7 23:55 -0:09 1.001
a0016.fits   flat                   0.7 23:56 -0:09 1.001
a0017.fits   flat                   0.7 23:56 -0:09 1.001
a0018.fits   flat                   0.7 23:57 -0:09 1.001
a0019.fits   flat                   0.7 23:57 -0:09 1.001
a0020.fits   flat                   0.7 23:58 -0:09 1.001

UT Date \underline{01/03/06} Observers \underline{P.Nandra,M.Brotherton}  CCD \underline{f3k}  Format \underline{1:3072,430:680}  Gain \underline{2.30}

Coll. Focus \underline{1} Decker \underline{98} Grating/Grism \underline{bl181} Filter \underline{gg455} Program \underline{SHEEP}

Disk  Exp UT Hour Air  Gr. Slit
Spectrum  Object  Time Start Angle Mass Tilt Width P.A.  Comments

a0021.fits   dark                     0 0:01  -0:09 1.001
a0022.fits   dark                     0 0:03  -0:09 1.001
a0023.fits   dark                     0 0:04  -0:09 1.001
a0024.fits   dark                     0 0:06  -0:09 1.001
a0025.fits   dark                     0 0:07  -0:09 1.001
a0026.fits   zero                     0 0:09  -0:09 1.001
a0027.fits   zero                     0 0:10  -0:09 1.001
a0028.fits   zero                     0 0:10  -0:09 1.001
a0029.fits   zero                     0 0:11  -0:09 1.001
a0030.fits   zero                     0 0:11  -0:09 1.001
a0031.fits   zero                     0 0:12  -0:09 1.001
a0032.fits   zero                     0 0:12  -0:09 1.001
a0033.fits   zero                     0 0:13  -0:09 1.001
a0034.fits   zero                     0 0:13  -0:09 1.001
a0035.fits   zero                     0 0:14  -0:09 1.001
test.fits  test                    10 1:17  +1:24 1.349
test.fits  test                    10 1:18  +1:25 1.352
test.fits  test                    10 1:29  +1:36 1.382
a0036.fits   focus-f110              10 1:31  +1:41 1.396
a0037.fits   focus-f110              10 1:36  +1:46 1.411

UT Date \underline{01/03/06} Observers \underline{P.Nandra,M.Brotherton}  CCD \underline{f3k}  Format \underline{1:3072,430:680}  Gain \underline{2.30}

Coll. Focus \underline{1} Decker \underline{98} Grating/Grism \underline{bl181} Filter \underline{gg455} Program \underline{SHEEP}

Disk  Exp UT Hour Air  Gr. Slit
Spectrum  Object  Time Start Angle Mass Tilt Width P.A.  Comments

a0038.fits   focus-f110              10 1:40  +1:50 1.424

a0039.fits
             cal-f110 (focus=11350)

                                    60

                                       1:47

                                             +1:54

                                                   1.440

a0040.fits   cal-f110                60 1:49  +1:56 1.446
a0041.fits   cal-f110                60 1:51  +1:58 1.455
a0042.fits   flat                   0.7 1:54  +2:01 1.467
a0043.fits   flat                   0.7 1:55  +2:01 1.469

a0044.fits
           henear at f110

                                    10

                                       1:56

                                             +2:03

                                                   1.475
a0045.fits
           long henear at f110

                                   120

                                       1:57

                                             +2:04

                                                   1.479
a0046.fits
           axj0058 source c1

                                   600

                                       2:07

                                             +0:35

                                                   1.009
a0047.fits
           axj0058 source c2

                                  1200

                                       2:22

                                             +0:50

                                                   1.019

a0048.fits   z4r5                  1200 2:48  -1:10 1.336
a0049.fits   flat                   0.7 3:10  -0:48 1.300

a0050.fits
           axj00587 source c2

                                  1200

                                       3:20

                                             +1:48

                                                   1.088
a0051.fits
           axj00587 source c2

                                  1200

                                       3:41

                                             +2:10

                                                   1.130
a0052.fits
           axj00587 source c2

                                  1200

                                       4:02

                                             +2:30

                                                   1.180
a0053.fits
           axj00587 source c2

                                  1200

                                       4:22

                                             +2:51

                                                   1.243
a0054.fits
           axj00587 source c2

                                  1200

                                       4:45

                                             +3:14

                                                   1.331

a0055.fits   flat                   0.7 5:07  +3:35 1.432
a0056.fits   flat                   0.7 5:07  +3:36 1.435
a0057.fits   AXJ04014 C1           1200 5:14  +0:39 1.188

UT Date \underline{01/03/06} Observers \underline{P.Nandra,M.Brotherton}  CCD \underline{f3k}  Format \underline{1:3072,430:680}  Gain \underline{2.30}

Coll. Focus \underline{1} Decker \underline{98} Grating/Grism \underline{bl181} Filter \underline{gg455} Program \underline{SHEEP}

Disk  Exp UT Hour Air  Gr. Slit
Spectrum  Object  Time Start Angle Mass Tilt Width P.A.  Comments

a0058.fits   z4r3                   900 5:42  +3:27 1.581
a0059.fits   flat                   0.7 5:59  +3:44 1.713
a0060.fits   flat                   0.7 6:00  +3:45 1.717

a0061.fits

                 AXJ04014 Source c1 (correct
                 offset)
                                  1200

                                       6:05

                                             +1:32

                                                   1.271
a0062.fits

                 AXJ04014 Source c1 (correct
                 offset)
                                  1200

                                       6:26

                                             +1:53

                                                   1.327
a0063.fits

                 AXJ04014 Source c1 (correct
                 offset)
                                  1200

                                       6:47

                                             +2:13

                                                   1.401

a0064.fits   flat                   0.7 7:11  +2:37 1.511
a0065.fits   flat                   0.7 7:11  +2:38 1.514
a0066.fits   UHA23                  600 7:17  +1:30 1.259
a0067.fits   UHA23                  600 7:28  +1:40 1.285
a0068.fits   flat                   0.7 7:42  +1:55 1.326
a0069.fits   flat                   0.7 7:43  +1:55 1.328
a0070.fits   AXJ0843 C2            1200 7:47  -1:27 1.098
a0071.fits   AXJ0843 C2            1200 8:08  -1:06 1.079
a0072.fits   flat                   0.7 8:29  -0:45 1.065
a0073.fits   flat                   0.7 8:30  -0:44 1.065
a0074.fits   Z4R16                 1200 8:36  -0:44 1.038
a0075.fits   flat                   0.7 8:59  -0:21 1.029
a0076.fits   flat                   0.7 8:59  -0:21 1.028
a0077.fits   AXJ10403               900 9:08  -2:04 1.153

UT Date \underline{01/03/06} Observers \underline{P.Nandra,M.Brotherton}  CCD \underline{f3k}  Format \underline{1:3072,430:680}  Gain \underline{2.30}

Coll. Focus \underline{1} Decker \underline{98} Grating/Grism \underline{bl181} Filter \underline{gg455} Program \underline{SHEEP}

Disk  Exp UT Hour Air  Gr. Slit
Spectrum  Object  Time Start Angle Mass Tilt Width P.A.  Comments

a0078.fits   AXJ10403               900 9:23  -1:48 1.119
a0079.fits   flat -- axj10403       0.7 9:40  -1:31 1.089
a0080.fits   flat -- axj10403       0.7 9:40  -1:31 1.089
a0081.fits   flat -- axj10403       0.7 9:42  -1:29 1.086
a0082.fits   flat -- axj10403       0.7 9:42  -1:29 1.086

a0083.fits
really flat now!

                       0.7

                            9:46

                                 -1:25

                                        1.080
a0084.fits
really flat now!

                       0.7

                            9:46

                                 -1:25

                                        1.080

a0085.fits   UHA 54                 900 9:51  -1:03 1.055

a0086.fits
flat for uha 54

                       0.7

                           10:10

                                 -0:44

                                        1.039
a0087.fits
flat for uha 54

                       0.7

                           10:10

                                 -0:44

                                        1.038
a0088.fits
flat for uha 54

                       0.7

                           10:11

                                 -0:43

                                        1.038

a0089.fits   UHA 03                 900 10:15 -1:36 1.079

a0090.fits
flat for uha 03

                       0.7

                           10:33

                                 -1:18

                                        1.058
a0091.fits
flat for uha 03

                       0.7

                           10:34

                                 -1:18

                                        1.058
a0092.fits
flat for uha 03

                       0.7

                           10:34

                                 -1:17

                                        1.057

a0093.fits   UHA 30                 900 10:38 -1:24 1.052

a0094.fits
flat for uha 30

                       0.7

                           10:56

                                 -1:06

                                        1.032
a0095.fits
flat for uha 30

                       0.7

                           10:56

                                 -1:06

                                        1.031
a0096.fits
flat for uha 30

                       0.7

                           10:57

                                 -1:05

                                        1.031

a0097.fits   UHA 59                 900 11:01 -1:40 1.076

UT Date \underline{01/03/06} Observers \underline{P.Nandra,M.Brotherton}  CCD \underline{f3k}  Format \underline{1:3072,430:680}  Gain \underline{2.30}

Coll. Focus \underline{1} Decker \underline{98} Grating/Grism \underline{bl181} Filter \underline{gg455} Program \underline{SHEEP}

Disk  Exp UT Hour Air  Gr. Slit
Spectrum  Object  Time Start Angle Mass Tilt Width P.A.  Comments

a0098.fits   UHA 59                 900 11:18 -1:23 1.054

a0099.fits
flat for uha 59

                       0.7

                           11:38

                                 -1:02

                                        1.034
a0100.fits
flat for uha 59

                       0.7

                           11:39

                                 -1:02

                                        1.033
a0101.fits
flat for uha 59

                       0.7

                           11:39

                                 -1:01

                                        1.033

a0102.fits   axj12413              1800 11:45 -1:26 1.054